)c (GeV/

jet,detector Tp 0 20 40 60 80 100 120 140 160 180 200

)c (GeV/

jet,particle Tp

0 20 40 60 80 100 120 140 160 180

3−10

2−10

1−10

1

= 5.02 TeV s pp PYTHIA8(Monash2013) + GEANT3 Charged Jets

= 0.4

R, _Tk

Anti- c > 0.15 GeV/

track Tp | < 0.9

track η | < 0.5, | jetη|